create table flowstat (
  `id` int(10) AUTO_INCREMENT NOT NULL,
  `src_ip` CHAR(8) NOT NULL,
  `dst_ip` CHAR(8) NOT NULL,
  `proto` smallint(2) unsigned NOT NULL DEFAULT 0,
  `src_port` smallint(5) unsigned NOT NULL DEFAULT 0,
  `dst_port` smallint(5) unsigned NOT NULL DEFAULT 0,
  `octets` INT unsigned NOT NULL DEFAULT 0,
  `packets` INT unsigned NOT NULL DEFAULT 0,
    PRIMARY KEY (`id`)
) ENGINE=MyISAM DEFAULT CHARSET=utf8;



INSERT INTO flowstat(`src_ip`, `dst_ip`, `proto`, `src_port`, `dst_port`, `octets`, `packets`) VALUES
('c0a80201', 'c0a805ba', 6, 49150, 443, 5281, 13),
('c0a80201', 'c0a805ba', 6, 49150, 443, 5281, 13)
